% Please use the skeleton file you have received in the
% invitation-to-submit email, where your data are already
% filled in. Otherwise please make sure you insert your
% data according to the instructions in PoSauthmanual.pdf
\documentclass{PoS}

\title{The Fermi Large Area Telescope: 9 years of on-orbit performance
}

\ShortTitle{}

\author{\speaker{Robert Cameron}\\
        KIPAC/SLAC/Stanford University
 \\
        E-mail: \email{rac@slac.stanford.edu
}}

%\author{Another Author\\
%        Affiliation\\
%        E-mail: \email{...}}

\abstract{
  The Fermi Large Area Telescope has been successfully operating in low Earth orbit almost continuously since its initial turn-on on 24 June 2008, for over 9 years. We present details of the current performance of the LAT detector and data acquisition sub-systems, together with long-term trends of key performance measures, and assess the expected performance in continued future operation. We also discuss the current and future status of the ground-based control, monitoring and data processing for the LAT.
}

\FullConference{7th Fermi Symposium 2017\\
		15-20 October 2017\\
		Garmisch-Partenkirchen, Germany}


\begin{document}

%\section{...}

%\begin{thebibliography}{99}
%\bibitem{...}
%....
%\end{thebibliography}

\end{document}
